<!--
 * @Author: your name
 * @Date: 2025-01-09 18:08:00
 * @LastEditTime: 2025-01-21 14:55:10
 * @LastEditors: bogon
 * @Description: In User Settings Edit
 * @FilePath: /performance-test/src/views/overview/components/cp_windspeed/index.vue
-->

<template>
  <div class="type-variable">
    <!-- 风能利用系数和风速分析 -->
    <div class="left">
      <FilterChart
        :windList="windEngineGroupList"
        @getEnfineList="getEnfineList"
        @handlePrevious="handlePrevious"
        @handleNext="handleNext"
      ></FilterChart>
      <el-alert type="info" :closable="false">
        <template v-slot:title>
          <div style="display: flex; align-items: center">
            <i
              class="el-icon-info"
              style="font-size: 20px; margin-right: 5px"
            ></i>
            <h3>分析说明:</h3>
          </div>
        </template>
        <div style="font-size: 12px; margin-top: 10px">
          分析风力发电机组的Cp值对于优化其性能和增强效率至关重要：通过测量和分析Cp，可以直观了解风机的效率。Cp值越接近贝兹极限，说明风机的设计和运行越高效。
        </div>
        <div style="font-size: 12px; margin-top: 10px">
          Cp的分析也是监测风机性能的重要手段。如果Cp值出现异常下降，可能预示着机械故障、叶片磨损或其他维护需求。
        </div>
      </el-alert>

      <div
        class="titleCharts"
        v-if="generalFilesDatas && generalFilesDatas.length > 0"
      >
        分析总图 :
      </div>
      <div v-for="(item, index) in generalFilesDatas">
        <lineAndChildLine
          :key="item.batchCode + index"
          :index="index"
          :ref="item.batchCode"
          :fileAddr="item.fileAddr"
        >
        </lineAndChildLine>
      </div>
      <div
        class="titleCharts"
        v-if="diagramRelationsDatas && diagramRelationsDatas.length > 0"
      >
        分析分图 :
      </div>
      <div v-for="(item, index) in diagramRelationsDatas">
        <lineChartsFen
          :key="item.fieldEngineCode + index"
          :index="index"
          :ref="item.fieldEngineCode"
          :fieldEngineCode="item.fieldEngineCode"
          :fileAddr="item.fileAddr"
        >
        </lineChartsFen>
      </div>

      <el-tabs value="first">
        <el-tab-pane label="意见描述" name="first">
          <TinymceEditor
            ref="editor"
            v-model="comment"
            @input="handleEditorInput($event)"
            @onClick="onClick"
          >
          </TinymceEditor>
        </el-tab-pane>
      </el-tabs>
      <el-row type="flex" class="row-bg" justify="end">
        <el-col :span="2" style="margin: 20px">
          <el-button type="primary" size="small" @click="handleComment"
            >提交评论</el-button
          >
        </el-col>
      </el-row>
    </div>
    <div class="right">
      <DicCard
        :batchCode="initBatchCode"
        :analysisTypeCode="analysisTypeCode"
        :commentDescriptionVos="commentDescriptionVos"
      >
      </DicCard>
    </div>
  </div>
</template>
<script>
import DicCard from "@/views/overview/components/dicCard/index.vue";
import FilterChart from "@/views/overview/components/filterChart/index.vue";
import lineAndChildLine from "@/views/performance/components/chartsCom/lineAndChildLine.vue";
import lineChartsFen from "@/views/performance/components/chartsCom/lineChartsFen.vue";
import TinymceEditor from "@/components/Tinymce.vue";
import {
  analysisDetail,
  queryAnalysisedEngine,
  analysisCommentEdit,
} from "@/api/performance";

export default {
  name: "cpWindspeed",
  components: {
    DicCard,
    FilterChart,
    lineAndChildLine,
    lineChartsFen,
    TinymceEditor,
  },
  props: {
    initBatchCode: {
      default: "",
      type: String,
    },
    analysisTypeCode: {
      default: "",
      type: String,
    },
    batchCodeList: {
      default: "",
      type: Array,
    },
  },
  data() {
    return {
      form: {
        value2: "",
      },
      comment: "",
      options: [],
      windEngineGroupList: [], //批次风机列表
      fieldEngineCodes: [], //选中风机
      generalFilesDatas: [], //总图
      diagramRelationsDatas: [], //分图
      commentDescriptionVos: [], //评论列表
      editableTabs: [],
    };
  },
  watch: {
    initBatchCode(newVal) {
      if (newVal) {
        this.fetchData(); // 调用合并后的函数
      }
    },
    analysisTypeCode(newVal) {
      if (newVal) {
        this.fetchData(); // 调用合并后的函数
      }
    },
  },
  mounted() {
    if (this.initBatchCode && this.analysisTypeCode) {
      this.fetchData(); // 调用合并后的函数
    }
  },
  methods: {
    async handleComment() {
      try {
        await analysisCommentEdit({
          batchCode: this.initBatchCode,
          analysisTypeCode: this.analysisTypeCode,
          commentList: this.editableTabs.map((item) => {
            return {
              commentTypeCode: item.commentTypeCode,
              comment: item.commentTypeName === "分析评论" ? this.comment : "",
            };
          }),
        });
        this.$message({
          type: "success",
          message: "保存成功",
        });
        this.comment = "";
        this.getAnalysisDetail();
      } catch (e) {
        console.error(e);
        this.loading = false;
      }
    },
    onSubmit() {
      console.log("submit!");
    },
    // 合并后的函数，处理数据请求
    async fetchData() {
      try {
        // 获取分析详情
        await this.getAnalysisDetail();
        // 获取风机列表
        await this.getWindEnfineList(this.initBatchCode, this.analysisTypeCode);
      } catch (err) {
        console.error("Failed to fetch data:", err);
      }
    },
    // 获取分析详情接口
    async getAnalysisDetail() {
      try {
        const result = await analysisDetail({
          batchCode: this.initBatchCode,
          analysisTypeCode: this.analysisTypeCode,
          fieldEngineCodes:
            this.fieldEngineCodes.length === 0
              ? undefined
              : this.fieldEngineCodes.join(","),
        });
        if (
          result.data &&
          result.data[0] &&
          result.data[0].commentTypeRelations
        ) {
          this.editableTabs = result.data[0].commentTypeRelations;
        }
        //当前评论展示获取
        if (
          result.data &&
          result.data[0] &&
          result.data[0].commentDescriptionVos
        ) {
          this.commentDescriptionVos = result.data[0].commentDescriptionVos;
        }
        this.generalFilesDatas =
          (result.data &&
            result.data[0] &&
            result.data[0].generalFiles &&
            result.data[0].generalFiles.filter((item) =>
              item.fileAddr.endsWith(".json")
            )) ||
          []; //总图数据
        this.diagramRelationsDatas =
          (result.data &&
            result.data[0] &&
            result.data[0].diagramRelations.filter((item) =>
              item.fileAddr.endsWith(".json")
            )) ||
          [];
      } catch (err) {
        console.error("Failed to fetch analysis details:", err);
      }
    },

    // 请求风机列表
    async getWindEnfineList(batchCode, analysisTypeCode) {
      // console.log("请求风机列表 分钟级");
      const resEngineList = await queryAnalysisedEngine({
        batchCode: batchCode,
        analysisTypeCode,
      });
      this.windEngineGroupList = resEngineList.data;
    },
    handleEditorInput(index, newVal) {
      // 更新对应的 comment 值
      // 如果该功能没有实现，可以删除这个方法
    },
    //获取选中风机list
    getEnfineList(data) {
      this.fieldEngineCodes = data;
      this.getAnalysisDetail();
    },
    //下一条
    handleNext() {
      const index = this.batchCodeList.findIndex(
        (item) => item === this.initBatchCode
      );
      if (index === this.batchCodeList.length - 1) {
        this.$message.warning("已经是最后一个分析结果了");
        return;
      }
      this.$emit("setInitBathCode", this.batchCodeList[index + 1]);
    },
    //上一条
    handlePrevious() {
      const index = this.batchCodeList.findIndex(
        (item) => item === this.initBatchCode
      );
      if (index === 0) {
        this.$message.warning("没有上一条了");
        return;
      }
      this.$emit("setInitBathCode", this.batchCodeList[index - 1]);
    },
    onClick() {},
  },
};
</script>
<style scoped lang="scss">
.type-variable {
  display: flex;
  height: 90%;
  overflow: hidden;

  .left {
    width: 30%;
    height: 100%;
    overflow: auto;
    padding: 20px;
    flex: 1;
  }

  .right {
    width: 250px;
    height: 100%;
    overflow: hidden;
  }
}

.titleCharts {
  font-size: 16px;
  font-weight: 500;
  margin-top: 20px;
}
</style>
